---
title: Home
layout: default
weight: 0
---
h2. Welcome to the Luon Network;

Although the Luon Network; provides many many "services":services.html for
Luon users, the web page has not been used much over the past years and
therefore contains only an overview and some basic information.

Cheers!

h2. News

h3. 2012-08-21 -- Moved!

Because all of the sysops have moved on from the "TU Eindhoven":http://www.tue.nl,
it has been long past due to move our servers as well. 
The move has been quite a task, but as of yesterday our servers are located
at a data center in Rijen, Noord-Brabant, NL via our new hoster,
"Bitency":https://bitency.nl/en.html.

Following this move will be a cleanup and then a restructuring of the
servers/services, as we are not limited by 3 physical machines anymore.

h3. 2011-09-13 -- Added web statistics

Every website hosted by us has received automated web statistics analysis
and an accompanying webpage that displays this information, available via
@http://<domain>/webstats@. 
See for example the "statistics of this site":http://luon.net/webstats.

With this transition, I moved from the old
"webalizer":http://webalizer.org/ to
"AWstats":http://awstats.sourceforget.net.  Old statistics (up until 11
September 2011) are still be available via
"http://webalizer.luon.net":http://webalizer.luon.net, optionally followed
by the domain name.

h3. 2011-09-07 -- Added webmail, refreshed wiki service

Only a few days before @sphere.luon.net@ will be shutdown, I have added a
"webmail service":https://webmail.luon.net/ that will access Luon mail or
mail on virtual domains hosted by Luon, hosted on @target.luon.net@.

I have also refreshed the "Luon Wiki":http://wiki.luon.net, switching from
gitit to "ikiwiki":http://ikiwiki.info.  We also support hosting other
ikiwikis, if needed.

Make sure our SSL certificates are valid!  If not, please let us know.
Due to the move it could be, though, that there is a hostname mismatch (for
example @*.vtilburg.net@ with @webmail.luon.net@).

h3. 2011-06-30 -- Added contacts/CardDAV service

To supplement out CalDAV "service":/services.html, I have enabled
CardDAV support and made it available via @contacts.luon.net@.

h3. 2011-03-15 -- Down due to electrical fire

Due to an electrical fire in the airconditioning unit, we have been
down for the past 36 hours because we first had to find out what
the cause was and the fire department/building manager asked us not
to start any of the equipment until this morning.

h3. 2011-02-01 -- Luonica; down

Our "StatusNet":http://status.net/ service Luonica; has been taken down due
to ongoing problems with the (rather unsupported) PostgreSQL-backend of
StatusNet.

h3. 2010-09-26 -- New website!

The previous website was not working anymore due to changes in PHP.  As a
result, this page has been defunct for many months, dare I say years.  But,
because most of the Luon people don't really check this website anyway, it
wasn't a big deal.  

I am not gonna pretend that this new site is going to be better and will
attract your recurrent visits now.  So, I've posted some (rather timeless)
info about the Luon Network; on here and we'll see how it goes from
there...

